\magnification=1200
\input xmppt
\nopagenumbers
\raggedbottom
\narrower
\parindent=0pt \parskip=\medskipamount
\def\c#1{\centerline{\bf ����� #1}\par\input c#1 }

\hrule
\bigskip
\vbox{\c1}
\bigskip
\hrule
\bigskip
\vbox{\c2}
\bigskip
\hrule
\bigskip
\vbox{\c3}
\bigskip
\hrule
\bigskip
\vbox{\c4}
\bigskip
\hrule
\bigskip
\vbox{\c5}
\bigskip
\hrule
\end
